       -0.4
             -0.2
                       0
                            0.2
                                    0.4

                  m_0^2 -0.4

                                                -0.2

                                                   0

                                                      0.2

                                                        0.4

                                                       m_1^2

    400

    450

    500

   550

   600
rho

                       0
                  m_0^2